% -*- Mode:Text -*- 
\documentstyle{report}
\includeonly{modcirc}

\input man8form
\input psfig
%\psdraft

\begin{document}
\input notecomm
\input cam8spec

\include{modcirc}
\include{modlist}
\end{document}
