% -*- Mode:Text -*- 
\documentstyle{report}
\input man8form
\input psfig

\begin{document}
\input notecomm
\input cam8spec

\figtwogiven{motherboard}{\psfig{figure=fig/motherboard.ps}}
{Simplified backview view of the \cam-box motherboard. Dotted lines
delimit ports, each consisting of one or more connectors.
On the glue ports, the small connectors are for clock-phase
feedback between adjacent modules.}

\end{document}
