COMMAND NAME:

        GRID

USAGE:
        GRID <label_dist>

        This command is used to set the label grid distance.  There will 
        be a  grid mark and time axis label mark every <label_dist> 
        nanoseconds.  If the grid is specified smaller than resolution then
        , grid will not be changed.
