COMMAND NAME:

        STATIC_CUR

USAGE:
        STATIC_CUR
        STATIC_CUR <time>

        This command causes a vertical cursor to be placed on the screen
		at <time> with corresponding value at its intersection with 
		waveforms to be displayed at the right hand edge of the screen.
		<time> can be entered from the keyboard or by using the LEFT
		MOUSE BUTTON.
