COMMAND NAME:

        WAVEFORM

USAGE:
        WAVEFORM
        WAVEFORM <time>
        WAVEFORM <time1> <time2>

        This command is used to set the time axis of the display.
		If only one argument is supplied that time becomes the new start
		time for the display. If two arguments are supplied the time axis is
		fitted to the specified times. 
