COMMAND NAME:

        HARDCOPY

USAGE:
        HARDCOPY <time1> <time2>

        This command is used to plot waveforms.  The time range can be 
	entered using the key board OR by pointing at the waveforms on
	the screen using the left mouse button.  The options that were
	specified in the Setup Manager using SETUP_PLOTTER command are
	used as the parameters for plotting.
