COMMAND NAME:

        SCROLL

USAGE:
        SCROLL number of ticks
        SCROLL

        This command provides a way to control the automatic scrolling
        feature during opening of signals.  If set to ON, display will be
        scrolled when each new signal is opened.
        If no arguments are provided, the command toggles the current value.
