COMMAND NAME:

        DIRECTIVES

USAGE:
        DIRECTIVES

        This command is used to invoke the form that is used to set
        the values of directive used by the simulator.

        The buttons on the form are activated by clicking the left mouse
        button.  Type-in fields can be changed by selecting the field
        with the left mouse button & typing in the new value with the
        key board.  Toggle fields can be toggled by clicking the left
        mouse button.  Scroll bar can be used to scroll up with the right
        mouse button & to scroll up with the left mouse button.
