 Allegro 5.0 - Lab for Add Pin, Step-and-Repeat Polar Mode

   The purpose of this lab is to become familiar with adding pins to a symbol using the step-and-repeat polar mode.  The user will create an radial grid of pins.

 1) Select  Add > Pin  command.

 2) Set Ministatus parameters as follows:

      Change Mode from Rectangular to Polar

        Padstack Name: PAD150
        Copies: 6
        Angle: 60
        Pin#: Next#:   1

 3) Pick polar origin at  "x 4000 y 4000".

 4) Pick first pin location at  "x 4300 4000".

 5) Press <F1> to continue to next frame ...
