COMMAND NAME:

        UPDATE_INTERVAL

ABBREVIATION:

        UP

USAGE:
        UPDATE_INTERVAL integer

        Sets the simulator to instruct the Display Manager to update
        the screen at intervals specified by "number" ticks while
        simulating for a longer time.  

