
     Command:   ADD13

     Display:   ADD THIS

This command allows you to add a box of size 1x3 menu units
(the size of the box in the tool menu) at a specified point in the menu.
After the command is invoked, a box of the selected size is attached to the
cursor when the cursor is moved into the graphics area.
You should position the box at the desired location then press the
mouse selector button.

All boxes should eventually be completely within the menu boundary
and not overlapping each other, although this command will not prevent you
from selecting whatever location is desired.
The DEFINE command is then automatically invoked to prompt for the
data associated with this box.
