
     Command:   CHANGE

     Display:   CHANGE BOX

This command allows you to change the size of a menu box.
You must first point to a box in the menu.
A popup is then displayed listing the possible menu box sizes.
If you make a selection from the popup, the box will be changed to the
selected size, keeping its upper left-hand corner in its original position.
No change will be made if you make a selection outside the popup.
This command repeats so you may point to additional boxes
to change their size or enter RETURN to exit from the command.
