
     Command:   MOVE

     Display:   MOVE BOX

This command allows you to move a menu box to a new location in the menu.
You are prompted to point to a box in the menu.
The indicated box is attached to the cursor, and you should position
the box at the desired location and press the mouse selector button.
This command repeats so you may point to additional boxes to change
their location or enter RETURN to exit from the command.

All boxes should eventually be completely within the menu boundary
and not overlapping each other, although this command will not prevent you
from selecting whatever location is desired.
