
     Command:   RESIZE

     Display:   DIMENSION

This command allows you to specify the dimensions of a new menu.
If there is already a menu being edited, a popup is displayed to determine
whether to resize the existing menu or start another one.
You are then prompted to enter the number of rows and columns
to be included in the menu.
When this information has been entered, the new menu with a border depicting
the new dimensions is displayed.
