
     COMMAND : change

     SYNTAX  : change <point>

The CHANGE command allows you to modify the stroke indicated by the cursor
when the mouse button was pressed.  
The edit display is output with the selected stroke and all its variations.
You may enter additional strokes or use one of the edit operations to modify
the existing data.

As with the NEW operation, you must select the ENTER or ABORT menu button
to return to the main display.

