
     COMMAND : delete

     SYNTAX  : delete <point>

The delete command is used to remove the stroke indicated by the cursor
when the mouse button is pressed.
The stroke is removed from the stroke data base,
but is copied to the UNDO record.
You may point at additional strokes to remove them,
or press the RETURN key to exit from the DELETE operation.

