
     COMMAND : enter

     SYNTAX  : _enter

The ENTER command saves the current stroke in the data base and
returns you to the main display.
This command should be used when you have finished creating or modifying a
stroke and there is a command string.
If no string has been associated with a stroke(s), a warning message is output,
but the stroke data is accepted and stored.
If no strokes have been entered for a given command,
nothing is stored and an error message is output.

