
     COMMAND : exit

     SYNTAX  : exit
               quit

This command allows you to exit from the stroke editor.
If any changes have been entered,
you are given the option of writing them out or simply exiting.
If you choose to write out the changes,
the strokes are stored in a file with the current stroke file name
and then the application exits.
