
     COMMAND : write

     SYNTAX  : write <stroke filename>

The WRITE command saves the current stroke data base in the specified file.
If no file name is given, STED will prompt you for a name.
Entering a carriage return causes it to use the default,
the name specified when the data was read in during the EDIT command.
This default is indicated in the prompt as well as on the status line.

