COMMAND NAME:

        VPCOPY

USAGE:

        VPCOPY <pt> <pt>

        This command is used to copy a viewport in the graphics area.
The first point selects the closest corner of the closest viewport to copy.
The second point specifies the location at which to place
the copy of the viewport.

        You cannot copy the the main graphics window with VPCOPY -
you can only use VPCOPY on a viewport which was
created by the VPADD command or a previous VPCOPY command.

