COMMAND NAME:

        AXIS

USAGE:
        AXIS [TOP | BOTTOM]

        This command is used to move the time axis from the TOP of the graphic
        display to the BOTTOM and vice versa.  If issued without a keyword,
        the command acts like a toggle, moving the time axis from its current
        location to the other end of the screen.
