COMMAND NAME:

        COMBINE

USAGE:
        COMBINE <sig_name_pos1> <sig_name_pos2> <operation> <sig_name>
                                                        <sig_pos> <end_time>

        This command is used to perform logical operations on named signals to
        create new signals.

        The user specifies the two signals to be combined via signal name or
        number from the keyboard or signal position via the LEFT MOUSE BUTTON.

        Legal operations include AND, OR and XOR.

        The signal resulting from the combination will be named <sig_name> and
        placed at <sig_pos>. It's length will be <end_time> nanoseconds.

SEE ALSO:
        INVERT 
