COMMAND NAME:

        CURSOR

USAGE:
        CURSOR <DEFAULT | FULL | TIME_DISPLAY>

        This command is used to set the cursor style.
        
        There are three options, DEFAULT (regular, small crosshair), FULL (full-
        screen crosshair), and TIME_DISPLAY (dynamic number at upper-lefthand
        corner of default cursor which changes as the time location of the 
        cursor changes).

        The option FULL is not supported in X windows.
