COMMAND NAME:

        INVERT

USAGE:
        INVERT <sig_name_pos>

        This command inverts all states of the selected signal.

        The user specifies the signal to be inverted via signal name or
        number from the keyboard or signal position via the LEFT MOUSE BUTTON.

SEE ALSO:
        COMBINE performs additional logical operations on signals.
