COMMAND NAME:

        RENAME

USAGE:
        RENAME <sig_name_pos> <sig_name>

        This command is used to change the signal name of the signal
        <sig_nam_pos>, where <sig_name_pos> allows either the signal name
        or number to be entered with the keyboard OR position to be specified
        with the LEFT MOUSE BUTTON. A signal with the name <sig_name> must
        NOT already exist in the database.
