COMMAND NAME:

        ROW

USAGE:
        ROW row_number
        ROW pt
        ROW [+ | -] number

        This command is used to pan along the y axis.  The command in the
        first and second forms shown above, will make the corresponding
        row, the new top of the screen.

        If the form with the optional + sign is specified, the  new top of
        the screen will be the current top row_number + number.

        If the form with the optional - sign is specified, the  new top of
        the screen will be the current top row_number - number.

        If the resulting row number is < 1 OR  > total signals on display,
        the row at the top will be the minimum OR maximum possible rows
        respectively.
