COMMAND NAME:

        WAVEFORMS

USAGE:
        WAVEFORMS <time>
        WAVEFORMS <time1> <time2>

        This command is used to set the time axis of the display.
        If only one argument is supplied that time becomes the new start
        time for the display. If two arguments are supplied the time axis is
        fitted to the specified times. 
