COMMAND NAME:

        COPY

USAGE:
        COPY SIGNAL <sig_name_pos> <sig_name_pos for new copy>

        This command is used to copy entire signals to other locations.

        Copy a signal <sig_name_pos> to another location <sig_name_pos for new
        sig>. Either signal location may be specified via a signal name or
        number using the keyboard OR by position using the LEFT MOUSE BUTTON. 
        Signals may be copied directly above, directly below, or in between any
        of the existing signals.
