COMMAND NAME:

        ERASE

USAGE:
        ERASE 

        This command clears the canvas area of the tool.

        Note that this command will not get rid of the activity on the signal,
        but will just clear the canvas area.  Use DELETE * command if you
        wish to get rid of the activity on all signals.
