COMMAND NAME:

        LIST

USAGE:
        LIST SIGNAL <sig_name | sig_number | position> ...
		LIST ALL

        This command is used to display information about the specified 
        signal(s).  Information includes the signal name and signal type.
        The list takes the form of a popup menu.

        Signals may be specified by entering the signal name or number from
        the keyboard or signal position via LEFT MOUSE BUTTON click in the
        Overview or graphics window.  To end the list, use the RIGHT MOUSE
        BUTTON  or  a carriage return.

		LIST ALL lists all the signals.
        
        The LEFT MOUSE BUTTON exits the popup menu.

        The popup displayed, will have the following information for each 
        signal :
     
             NAME   TYPE  RADIX.

        TYPE field can be CLOCK or DATA.  CLOCK type indicates that the 
        signal was converted into a clock using the CLOCK command in the 
        Stimulus Generator.  All other signals are of type DATA.
     

        NOTE: the LIST command cannot be used in a script.
