COMMAND NAME:

        MOVE

USAGE:
        MOVE SIGNAL <sig_name_pos> <new sig_name_pos>

        This command is used to move entire signals to other locations.
        
        Move a signal <sig_name_pos> to another location <sig_name_pos>. 
        <sig_name_pos> and <new sig_name_pos> can be specified via the signal 
        name or number using the keyboard OR by position using the LEFT MOUSE
        BUTTON.  Signals may be moved directly above, directly below, or in
        between any of the existing signals.

        NOTE: MOVE AREA and MOVE SEGMENT cannot be used in a script.
