COMMAND NAME:

        PAN

USAGE:
        PAN < UP | DOWN | LEFT | RIGHT >

        This command is used to pan the view along the time axis 
        (LEFT | RIGHT) or vertically (UP | DOWN). Repeatedly pressing
        the LEFT MOUSE BUTTON will continue the original pan direction.
        If no direction specifier is given and the LEFT button is pressed
        the default pan direction is RIGHT.
