COMMAND NAME:

        QUIT

USAGE:
        QUIT
        QUIT yes

        This command is used to terminate the application.
    
        When the QUIT command is entered without an argument via the keyboard, 
        the system prompts for confirmation.  Answer "yes" or "y" to exit the
        tool. Answer "no", "n", or carriage return to abort the QUIT command 
        and resume editing.

        Entering "QUIT yes" or "QUIT y" will cause the application to terminate
        immediately.

        When the QUIT command is entered via the menu button, the system issues
        a confirmation window. Press the LEFT mouse button to exit the tool.
        Press the RIGHT mouse button to cancel the QUIT command.
