COMMAND NAME:

        RECALL

USAGE:
        RECALL
        RECALL <time>
        RECALL <time1> <time2>

        This command is used to recall waveform activity for the current
        design.

        If no argument is supplied, the entire waveform activity file will
        be recalled.

        If only one argument is supplied that time becomes the start time
        for recalling waveform and all waveform will be recalled to the end.

        If two arguments are supplied then the waveform will be recalled
        only in this period of time.
