COMMAND NAME:

        REMOVE

USAGE:
        REMOVE signal name | pt

        This command removes a signal from the display list of the tool.

        Signal name can be provided from the key board OR by pointing with
        LEFT mouse button.

        Note that this command will not get rid of the activity on this signal,
        but will remove it from the display list.  Use DELETE command if you
        wish to get rid of the activity on a signal.
