COMMAND NAME:

        ADJUST_TIMING

USAGE:
        ADJUST_TIMING

        This command is used to invoke the form that provides the list
        of options to invoke the Timing Processor.

        The buttons on the form are activated by clicking the left
        mouse button.  Type-in fields can be changed by selecting the 
        field with the left mouse button & typing in the new value 
        with the key board.  Toggle fields can be toggled by clicking 
        the left mouse button.

        CMD File type-in field is used to specify the command file
        name for the Timing Processor.

        Tproc Path type-in field is used to specify the path to 
        a user customized Timing Processor.

        ValidSIM Delay Calc toggle field controls the algorithms used for
        doing delay calculations.  When turned ON, the results will be less
        accurate, but same as validsim.

        ValidSIM Wire Delay toggle field controls the handling of wire delay
        feedback. When turned ON, the results will be less accurate, but same 
        as validsim. Also, the simulation will be faster.

        Delay estimator toggle field turns the delay estimation on or off.

        Expression evaluator toggle field turns expression evaluation on
        or off.  If this is turned on, delay estimator toggle field value
        is ignored.

        PCB mode toggle field controls the algorithm used for stop counting.
        By default, this is off, which means the ASIC mode is used.  If 
        Validsim compatibility is on, this directive is ignored.

        Replicate toggle field is used only in validsim compatibility mode
        to handle replicate bodies.
