COMMAND NAME:

        CANCEL

USAGE:
        CANCEL 

        This command is used to indicate that user wants to quit without
        setting up the RapidSIM system to start simulations.  If this
        command is used to leave the Setup Tool, setup operations must
        be performed again, before starting simulation.
