
COMMAND NAME:

        MENUSWITCH

USAGE:

        MENUSWITCH

        This command moves the Menu Button panel over to
        the other side of the screen. By default, the Menu Buttons
        will be on the LEFT. Invoking this command would swap the
        Menu Buttons to the RIGHT side. A further call to the
        command would reset the Menu Buttons to the LEFT side.

