COMMAND NAME:

        DONE

USAGE:
        DONE 

        This command is used to indicate that user wants to quit without
	setting up the RapidSIM system to start simulations.  If this
	command is used to leave the Setup Tool, setup operations must
	be performed again, before starting simulation.
