COMMAND NAME:

        SETUP_PLOTTER

USAGE:

        SETUP_PLOTTER

        This command is used to invoke the form that is used to set options
        for plotting in the Logic WorkBench.

        The buttons on the form are activated by clicking the left
        mouse button.  Type-in fields can be changed by selecting the 
        field with the left mouse button & typing in the new value 
        with the key board.  Toggle fields can be toggled by clicking 
        the left mouse button.

        Output type-in field is used to specify how the plotter output is
        generated.  Option Local sends the plot output directly to the
        plotter hooked up to the user's machine.  Option Local generates
        a file called vw.spool in the current directory, containing the
        plot output, which can be plotted using HPF.  Option 'To GED Files'
        generates the plot output as GED drawings. This information can be
        viewed & modified using GED & the parameters specified for the
        options GED drawing name & SCALD Directory Filename.

        Plotter type-in field is used to indicate the type of plotter for
        which the output is to be generated if the Output option is set to
        Local or Spooled.  Please refer to the Guide to Operations manual
        for your platform for the list of supported plotters.

        Page Size specifies the size of the page to be used.

        Ticks Per Page controls the number of ticks of waveform data in each
        page of the output. Please refer to the Logic WorkBench manual for
        more detailed information on this option.

        Signals Per Page controls the number of signals in each page of the 
        output. Please refer to the Logic WorkBench manual for more detailed 
        information on this option.

        GED drawing name field is used to specify the name of the GED drawing
        generated with the waveform data, if the option 'To GED Files' is 
        used for Output option.

        SCALD Directory Filename field is used to specify the name of the 
        SCALD directory file to be used, if the option 'To GED Files' is 
        used for Output option.
