COMMAND NAME:

        a2ged

USAGE:
        a2ged

        Enter a2ged on the command line or pick the A2Ged icon to
display the Feedback Allegro to GED form and the GED Schematic Browser
window. Select your options and pick Execute to bring information
from an Allegro design into an associated GED schematic.

        COMMAND LINE EQUIVALENT:

        a2ged
