COMMAND NAME:

        dir

USAGE:
        Dir> Base
        Dir> Device Lib
        Dir> Down Level
        Dir> Padstack Lib
        Dir> Print
        Dir> Properties
        Dir> Symbol Lib
        Dir> Up Level

Dir> Base

        The Dir> Base command changes your current directory to the
directory displayed when you log in to Allegro.

        COMMAND LINE EQUIVALENT:

        cd $BASE

Dir> Device Lib

        The Dir> Device Lib command identifies directories that contain
device information.

        COMMAND LINE EQUIVALENT:

        cdlib -filter *.txt DEVPATH

Dir> Down Level

        The Dir> Down command identifies other directories
nested in the current working directory and displays a message that
reads, "Pick a file icon to change directory."  Position the cursor
other the icon or name of the directory you want to open and click
the mouse.  Allegro opens the directory and displays its contents
in the Browser window.

        COMMAND LINE EQUIVALENT:

        cddown

Dir> Padstack Lib

        The Dir> Padstack Lib command identifies the directories
that contain padstacks.

        COMMAND LINE EQUIVALENT:

        cdlib -filter *.pad PADPATH

Dir> Print

        The Dir> Print command prints the current working directory
in the Browser window to the operating system's line printer. Use
the Allegro Resource icon (under Config) to specify a line printer.

        COMMAND LINE EQUIVALENT:

        print cwd

Dir> Properties

        The Dir> Properties command displays the File Information
form that identifies ownership, permissions, and date and time of
last use for the directory.

        COMMAND LINE EQUIVALENT:

        properties cwd

Dir> Symbol Lib

        The Dir> Symbol Lib command identifies directories
that contain symbols.

        COMMAND LINE EQUIVALENT:

        cdlib -filter *.?sm PSMPATH

Dir> Up Level

        The Dir> Up Level command changes your current directory
to the next higher level directory.

        COMMAND LINE EQUIVALENT:

        cd . .
