COMMAND NAME:

        pause

USAGE:
        pause [<time in seconds>]

        The pause command suspends processing when playing a script. 
You can resume processing by pressing any key or clicking the mouse. 
When the pause command is accompanied by an integer, the
script suspends processing for the specified number of seconds before
processing is continued.  A pause box appears in the display when
a script encounters a pause.

EXAMPLES:

        pause

        pause 30

        RELATED COMMANDS:

        record
replay
start
stop
stopwatch
