COMMAND NAME:

        setwindow

USAGE:
        setwindow [<window name>]

        The setwindow command assigns the keyboard/script focus to
the window you have identified.  If you execute the  command without
naming a window, Allegro displays the name of the active window. 
This command is typically used in scripts to direct commands to a
window.

EXAMPLE:

        setwindow browser
