COMMAND NAME:

        stop

USAGE:
        stop

        The stop command halts the recording of a script.  When you
finish recording a script and use the stop command, "Allegro
removes the Record" box from the desktop.

EXAMPLE:

        stop

        RELATED COMMANDS:

        record
replay
scriptmode
