COMMAND NAME:

        stopwatch

USAGE:
        stopwatch [<option>]

        The stopwatch command reports time to a tenth of a millisecond
in hh:mm:ss:ff format and provides the following options:

        - lap reports time elapsed and keep clock running

        - start starts the clock without resetting (for example,
continues from previous time)

        - stop stops the clock and displays elapsed time

        - reset returns the clock to zero and starts the clock

        - normal reports the time in hh:mm:ss:ff format

        - second reports the time in seconds and millisecond format

        If you execute the stopwatch command without specifying one
or more options, Allegro displays the list of options.  Re-enter the
command with the appropriate options.

EXAMPLE:

        stopwatch start normal
