 Allegro 5.0 - Lab for Drafting Chamfers (Part 2)

   The purpose of this lab is to familiarize the user with the Chamfer command.

 1) Select  Draft > Chamfer  command.

 2) Change Ministatus "First Segment" Trim to 200.

 3) Select by window the rectangular outline shown.

 4) Note that all corners are chamferred.  In group/window mode, chamfer will only operate on contiguous lines of the same parent.  Corners cannot be re-chamferred in group/window mode.

 5) Press <F1> to continue to next frame ...
