 Allegro 5.0 - Lab for Drafting Chamfers

   The purpose of this lab is to familiarize the user with the Chamfer command.

 1) Select  Draft > Chamfer  command.

 2) Change Ministatus "First Segment" Trim to 200.

 3) Pick the two segments.  Observe the chamfer created and that the original segments have been trimmed to the chamfer endpoints.

 4) Change the Ministatus "First Segment" Trim to 400.  Repick the two segments.  Note that you can re-chamfer segments.

 5) Change Ministatus "Chamfer Angle" to 60 degrees.  Repick the two segments.  Note that the 60 degree angle is between the first segment picked and the chamfer segment.

 6) Press <F1> to continue to next frame ...
