 Allegro 5.0 - Lab for Dimensioning 45-degree Chamfers

   The purpose of this lab is to familiarize the user with the dimensioning of 45-degree chamfers in different drafting standards.

 1) Select  Leaders > 45 Chamfer  command.

 2) For ANSI, pick on chamfer c1, leader vertices p1 and p2, then "Dimension Value" with popup selection.

 3) Open the Drafting Parameter Form and select the ISO standard. Create the dimension using chamfer c2, and leader vertices p3 and p4.

 4) Select the JIS standard and create the dimension using chamfer c3, and vertecs p5 and p6.

 5) Select the BSI standard and create the dimension using chamfer c4, and vertecs p7 and p8.

 6) Note that this command assumes that the segment you are dimensioning is a 45-degree chamfer, it does no checking of the segment angle.

 7) Press <F1> to continue to next frame ...
