 Allegro 5.0 - Lab for Datum Dimensioning (Part 3)

   The purpose of this lab is to do Datum Dimensioning in window mode for the ISO drafting standard.

 1) Change the current standard to ISO in the Drafting Parameter Form.

 2) Select  Datum  command.

 3) Select the reference datum feature by picking on circle c1.  Define the horizontal "0" point by picking at p1, no "Next" is required.  Define the vertical "0" point by picking at p2. 

 4) Select "Window" from the popup, and stretch a window completely surrounding the board outline.  Pick "Complete" from the popup.

 5) Note that all features are dimensioned in one action.

 6) Press <F1> to continue to next frame ...

